y 0 2 4

0 / D + cΛ

0.0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 c < 8 GeV/_Tp2 <

ALICE = 7 TeV s pp,

= 5.02 TeV NNs Pb, -p LHCb = 7 TeV s pp,